\begin{PROFILE}
\HavePortraittrue%
\DEF{所属}{\所属P{323691}{Graduate School of Technology, Industrial and Social Sciences Division of Science and Technology Mechanical Science Energy System }\所属S{309264}{Faculty of Science and Technology Department of Science and Technology Mechanical Science Energy System }\所属S{366132}{Graduate School of Sciences and Technology for Innovation Science and Technology Mechanical Science Energy System }\所属S{145264}{Graduate School of Advanced Technology and Science Intelligent Structures and Mechanics Systems Engineering Mechanical Engineering Mechanical Systems }}%
\DEF{EID}{10643}%
\DEF{肩書}{Assistant Professor}%
\DEF{名前}{Kusano, Koji}%
\DEF{名前:日}{草野 剛嗣}%
\DEF{名前:読}{くさの こうじ}%
\DEF{名前:英}{Kusano, Koji}%
\DEF{職名}{Assistant Professor}%
\DEF{性別}{{\NONE}}%
\DEF{生年}{1968}%
\DEF{電話}{+81-88-656-2151}%
\DEF{電子メール}{\EdbEMAIL{kusano@me.tokushima-u.ac.jp}{kusano@me.tokushima-u.ac.jp}}%
\DEF{学歴}{%
	\履歴{1991.{\EdbZSp}3.}{熊本大学 工学部 機械工学科 卒業}%
 %
	\履歴{1993.{\EdbZSp}3.}{熊本大学 大学院 工学研究科 機械工学専攻 修士課程修了}%
 %
	\履歴{1996.{\EdbZSp}3.}{熊本大学 大学院 自然科学研究科 生産システム専攻 博士課程修了}%
 %
}%
\DEF{学位}{Doctor of Engineering (Kumamoto University) (\DateYM{1996.{\EdbZSp}2})}%
\DEF{職歴}{%
	\履歴{1996.{\EdbZSp}4.}{徳島大学 助手.工学部 機械工学科}%
 %
}%
\DEF{担当授業科目}{%
\BULLET{}{\bfseries SIH(Strike while the Iron is Hot) Training} (Common Curriculum) %
\BULLET{}{\bfseries オリエンテーション3年} (Bachelor Course) %
\BULLET{}{\bfseries Numerical Analysis for Mechanical Engineering} (Bachelor Course) %
\BULLET{}{\bfseries Mechanical Engineering Laboratory 3} (Bachelor Course) %
\BULLET{}{\bfseries Thermal Engineering 1} (Bachelor Course) %
}%
\DEF{学生指導経験数}{%
13 students (bachelor), 12 students (master)}%
\DEF{専門分野}{%
\BULLET{}{\bfseries Heat Transfer Engineering} %
\BULLET{}{\bfseries Multiphase Flow} %
\BULLET{}{\bfseries Refrigeration and Air Conditioning Engineering} %
}%
\DEF{研究概要}{%
\BULLET{}Heat and Species Transfer Phenomena in Aqueous Solution (\KEYWORD{Solid/Liquid Phase Change Heat Transfer}, \KEYWORD{Latent Thermal Energy Storage}, \KEYWORD{Numerical Analysis}, \KEYWORD{Multiphase Flow}) %
\BULLET{}液$\cdot{}$液系二相流における流動諸特性に関する研究 (\KEYWORD{Solid/Liquid Phase Change Heat Transfer}, \KEYWORD{Latent Thermal Energy Storage}, \KEYWORD{Numerical Analysis}, \KEYWORD{Multiphase Flow}) %
\BULLET{}土壌の凍結及び融解に及ぼす諸パラメータの影響に関する研究, 固-液相変化を利用した潜熱蓄熱に関する研究 (\KEYWORD{Solid/Liquid Phase Change Heat Transfer}, \KEYWORD{Latent Thermal Energy Storage}, \KEYWORD{Numerical Analysis}, \KEYWORD{Multiphase Flow}) %
}%
\DEF{著書・論文:数}{%
\著作件数{Academic Paper (Judged Full Paper)}{18}\著作件数{Academic Paper (Unrefereed Paper)}{2}\著作件数{Review, Commentary}{1}\著作件数{Proceeding of International Conference}{22}\著作件数{Proceeding of Domestic Conference}{59}\著作件数{Et cetera, Workshop}{5}}%
\DEF{著書・論文}{%
}%
\DEF{所属学会(役職):数}{7}%
\DEF{社会・学内活動等:数}{0}%
\DEF{受賞等:数}{0}%
\DEF{所属学会(役職)}{%
\BULLET{}\項目II{Heat Transfer Society of Japan}{} %
\BULLET{}\項目II{Japan Society of Mechanical Engineers}{} %
\BULLET{}\項目II{Japan Society Refrigerating and Air Conditioning Enfineers}{} %
\BULLET{}\項目II{The Japanese Society for Multiphase Flow}{} %
\BULLET{}\項目II{The Japanese Geotechnical Society}{} %
\BULLET{}\項目II{The Japan Society for Aeronautical and Space Science}{} %
\BULLET{}\項目II{Space Solar Power Systems Society}{} %
}%
\DEF{社会・学内活動等}{%
{\NONE}}%
\DEF{受賞等}{{\NONE}}%
\end{PROFILE}
\endinput
