\begin{PROFILE}
\HavePortraittrue%
\DEF{所属}{\所属P{323698}{Graduate School of Technology, Industrial and Social Sciences Division of Science and Technology Electrical and Electronic Engineering Electrical Energy Engineering }\所属S{309344}{Faculty of Science and Technology Department of Science and Technology Electrical and Electronic Engineering Electrical Energy Engineering }\所属S{147009}{Graduate School of Advanced Technology and Science Systems Innovation Engineering Electrical and Electronic Engineering Electric Energy Engineering }\所属S{366139}{Graduate School of Sciences and Technology for Innovation Science and Technology Electrical and Electronic Engineering Electrical Energy Engineering }}%
\DEF{EID}{25080}%
\DEF{肩書}{Professor}%
\DEF{名前}{Kawada, Masatake}%
\DEF{名前:日}{川田 昌武}%
\DEF{名前:読}{かわだ まさたけ}%
\DEF{名前:英}{Kawada, Masatake}%
\DEF{職名}{Professor}%
\DEF{性別}{{\NONE}}%
\DEF{生年}{{\NONE}}%
\DEF{電話}{{\NONE}}%
\DEF{電子メール}{{\NONE}}%
\DEF{学歴}{%
{\NONE}}%
\DEF{学位}{Ph.D.\ in Engineering}%
\DEF{職歴}{%
	\履歴{1998.{\EdbZSp}6.}{Nagoya Institute of Technology, Assistant Professor}%
 %
	\履歴{2002.{\EdbZSp}3.}{University of Tokushima, Lecturer}%
 %
	\履歴{2003.{\EdbZSp}11.}{University of Tokushima, Associate Professor}%
 %
	\履歴{2005.{\EdbZSp}3.}{University of Southern California, Visiting Scholar}%
 %
	\履歴{2006.{\EdbZSp}4.}{University of Tokushima, Associate Professor (Institute of Technology and Science)}%
 %
	\履歴{2007.{\EdbZSp}4.}{University of Tokushima, Associate Professor (Institute of Technology) *Title name in Japanese was chaged.}%
 %
	\履歴{2016.{\EdbZSp}4.}{Professor, Graduate School of Science and Technology, Tokushima University}%
 %
	\履歴{2017.{\EdbZSp}4.}{Professor, Graduate School or Technology, Industrial and Social Sciences}%
 %
}%
\DEF{担当授業科目}{%
\BULLET{}{\bfseries Presentation Method (D)} (Graduate School) %
\BULLET{}{\bfseries Introduction to Technical English} (Bachelor Course) %
\BULLET{}{\bfseries Interdisciplinary Seminar in Science and Technology} (Graduate School) %
\BULLET{}{\bfseries Power Generation and Transformation Engineering} (Bachelor Course) %
\BULLET{}{\bfseries Advanced Theory of Electric Power Engineering} (Graduate School) %
\BULLET{}{\bfseries Electric Power System Engineering} (Bachelor Course) %
\BULLET{}{\bfseries Power System Electromagnetic Compatibility} (Graduate School) %
\BULLET{}{\bfseries Management and Laws Associated with Electrical Facilities} (Bachelor Course) %
\BULLET{}{\bfseries Graduate Research on Electrical and Electronic Engineering} (Graduate School) %
\BULLET{}{\bfseries Electrical and Electronic Engineering Laboratory 1} (Bachelor Course) %
\BULLET{}{\bfseries Special Lectures on Electrical and Electronic Engineering} (Bachelor Course) %
\BULLET{}{\bfseries Advanced Theory of Electromagnetic Compatibility} (Graduate School) %
}%
\DEF{学生指導経験数}{%
11 students (bachelor)}%
\DEF{専門分野}{%
\BULLET{}{\bfseries Electric Power Engineering, Electric Power Systems Engineering, Sensing Engineering, Signal and Image Processing} %
}%
\DEF{研究概要}{%
\BULLET{}Development of Diagnostic Techniques for Electric Power Equipment and Facilities using Radio Sensing, Intelligent Signal and Image Processing, Development of Diagnostic Techniques for Turbine Generators (Insulation, Vibration, Bearing) using Radio Sensing, Intelligent Signal and Image Processing, Development of Diagnostic Techniques for Ground Coils of Superconducting Maglev Systems by using Radio Sensing, Development of Diagnostic Techniques for Power Cables in Aerospace Environment by using Radio Sensing (\KEYWORD{Radio Sensing Techniques}, \KEYWORD{signal and image processing}, \KEYWORD{insulation diagnosis}, \KEYWORD{computational electromagnetics}, \KEYWORD{power delivery}) %
}%
\DEF{著書・論文:数}{%
\著作件数{Academic Paper (Judged Full Paper)}{40}\著作件数{Academic Paper (Unrefereed Paper)}{2}\著作件数{Academic Letter}{5}\著作件数{Review, Commentary}{1}\著作件数{Proceeding of International Conference}{70}\著作件数{Proceeding of Domestic Conference}{104}\著作件数{Et cetera, Workshop}{6}\著作件数{Report}{3}\著作件数{Patent}{4}}%
\DEF{著書・論文}{%
}%
\DEF{所属学会(役職):数}{21}%
\DEF{社会・学内活動等:数}{38}%
\DEF{受賞等:数}{25}%
\DEF{所属学会(役職)}{%
\BULLET{}\項目II{IEEE: The Institute of Electrical and Electronics Engineers}{ ( [\期間{2000.{\EdbZSp}1{\EdbZSp}$\sim${\EdbZSp}2023.{\EdbZSp}12}])} %
\BULLET{}\項目II{IEEE Shikoku Section}{ (Student Activities Chair [\期間{2011.{\EdbZSp}4{\EdbZSp}$\sim${\EdbZSp}2013.{\EdbZSp}3}])} %
\BULLET{}\項目II{The Institute of Electrical Engineers of Japan}{ (学会活動推進委員 [\期間{2010.{\EdbZSp}4{\EdbZSp}$\sim${\EdbZSp}2012.{\EdbZSp}3}])} %
\BULLET{}\項目II{Health and Behavior Science}{ (Councilor [\期間{2002.{\EdbZSp}4{\EdbZSp}$\sim${\EdbZSp}2006.{\EdbZSp}3}])} %
\BULLET{}\項目II{IEEJ Shikoku Section}{ (Counselor [\期間{2007.{\EdbZSp}4{\EdbZSp}$\sim${\EdbZSp}2009.{\EdbZSp}3}])} %
\BULLET{}\項目II{Shikoku-section Joint Convention of the 2011 Institutes of Electrical and related Engineers}{ (Executive Committee [\期間{2011.{\EdbZSp}4{\EdbZSp}$\sim${\EdbZSp}9}])} %
\BULLET{}\項目II{The Institute of Electrical Engineers of Japan}{ (9.Steering Committee of Annual Conference (2005, Assistant Organizer) [\期間{2004.{\EdbZSp}4{\EdbZSp}$\sim${\EdbZSp}2005.{\EdbZSp}3}])} %
\BULLET{}\項目II{IEEJ Deputy Secretary of Special Committee on Problems of Electromagnetic}{ (Assistant Organizer [\期間{2000.{\EdbZSp}6{\EdbZSp}$\sim${\EdbZSp}2002.{\EdbZSp}12}])} %
\BULLET{}\項目II{Research Committee of Soft Processing of the Institute of Electronics, Information and Communication Engineers}{ (Research Committee [\期間{2001.{\EdbZSp}5{\EdbZSp}$\sim${\EdbZSp}2003.{\EdbZSp}4}])} %
\BULLET{}\項目II{Special Committee of Diagnosis Techniques for Insulating Materials of Power Equipment of IEEJ}{ (Committee [\期間{2007.{\EdbZSp}4{\EdbZSp}$\sim${\EdbZSp}2010.{\EdbZSp}3}])} %
\BULLET{}\項目II{Special Committee on Security Guideline for Biological Effect of Electromagnetic Fields on Living Body and Trend of Evaluation Techniques for Compatibility}{ (Committee [\期間{2010.{\EdbZSp}4{\EdbZSp}$\sim${\EdbZSp}2013.{\EdbZSp}3}])} %
\BULLET{}\項目II{Society of Signal Processing Applications and Technology of}{ (Steering Committee [\期間{1998.{\EdbZSp}4{\EdbZSp}$\sim${\EdbZSp}2002.{\EdbZSp}3}])} %
\BULLET{}\項目II{Shikoku-section Joint Convention of the 2013 Institutes of Electrical and related Engineers}{ (Program Committee [\期間{2013.{\EdbZSp}7{\EdbZSp}$\sim${\EdbZSp}9}])} %
\BULLET{}\項目II{The Institute of Electrical Engineers of Japan (1994.8-2013.3)}{} %
\BULLET{}\項目II{Shikoku-section Joint Convention of the 2014 Institutes of Electrical and related Engineers}{ (Program Committee [\期間{2014.{\EdbZSp}7{\EdbZSp}$\sim${\EdbZSp}9}])} %
\BULLET{}\項目II{Shikoku-section Joint Convention of the 2016 Institutes of Electrical and related Engineers}{ (Program Committee [\期間{2016.{\EdbZSp}7{\EdbZSp}$\sim${\EdbZSp}9}])} %
\BULLET{}\項目II{The IEEE Dielectrics and Electrical Insulation Society}{ (Administrative Committee : https://ieeedeis.org/about/adcom/adcom-roster/ [\期間{2020.{\EdbZSp}1{\EdbZSp}$\sim${\EdbZSp}2022.{\EdbZSp}12}])} %
\BULLET{}\項目II{The IEEE Electrical Insulation Conference, (https://ieee-eic.org/eic-2021-organizing-team/)}{ (EIC Board of Governors [\期間{2021.{\EdbZSp}1{\EdbZSp}$\sim${\EdbZSp}2023.{\EdbZSp}12}])} %
\BULLET{}\項目II{The IEEE Electrical Insulation Conference, (https://ieee-eic.org/eic-2021-organizing-team/)}{ (EIC2021,Organizing Committee, Eastern Region Chair [\期間{2021.{\EdbZSp}1{\EdbZSp}$\sim${\EdbZSp}7}])} %
\BULLET{}\項目II{The IEEE Dielectrics and Electrical Insulation Society}{ (Administrative Committee : https://ieeedeis.org/about/adcom/adcom-roster/ [\期間{2023.{\EdbZSp}1{\EdbZSp}$\sim${\EdbZSp}2025.{\EdbZSp}12}])} %
\BULLET{}\項目II{The IEEE Electrical Insulation Conference, (https://ieee-eic.org/eic-2021-organizing-team/)}{ (EIC Board of Governors [\期間{2024.{\EdbZSp}1{\EdbZSp}$\sim${\EdbZSp}2026.{\EdbZSp}12}])} %
}%
\DEF{社会・学内活動等}{%
\BULLET{}\項目II{{\bfseries 徳島電気技術協会}}{ (会計 [\期間{2006.{\EdbZSp}4{\EdbZSp}$\sim${\EdbZSp}2008.{\EdbZSp}5}])} %
\BULLET{}\項目II{{\bfseries Committee of Diagnostic Technologies and Asset Management for Underground Transmission Facilities, Electric Technology Research Association}}{ (Committee Member [\期間{2008.{\EdbZSp}3{\EdbZSp}$\sim${\EdbZSp}2010.{\EdbZSp}9}])} %
\BULLET{}\項目II{{\bfseries Committee of Mainenance Methods for Underground Transmission Cable Systems, Electric Technology Research Association}}{ (Committee Member [\期間{2011.{\EdbZSp}3{\EdbZSp}$\sim${\EdbZSp}2013.{\EdbZSp}9}])} %
\BULLET{}\項目II{{\bfseries Assembly on Educaiton for Electrical Engineering in University}}{ (Steering Committee [\期間{2004.{\EdbZSp}7}])} %
\BULLET{}\項目II{{\bfseries Committee of Techniques for Designing CV Cable Equipment, Electric Technology Research Association}}{ (Committee Member [\期間{2014.{\EdbZSp}1{\EdbZSp}$\sim${\EdbZSp}2016.{\EdbZSp}9}])} %
\BULLET{}\項目II{{\bfseries 徳島電気技術協会}}{ (庶務幹事 [\期間{2016.{\EdbZSp}5{\EdbZSp}$\sim${\EdbZSp}2018.{\EdbZSp}5}])} %
\BULLET{}\項目II{{\bfseries Investigation Commission on the Niiza Cable Tunnel Accident, TEPCO Power Grid, Inc.,(https://www.tepco.co.jp/pg/company/press-information/information/2016/1334954\_8914.html)}}{ (Committee member [\期間{2016.{\EdbZSp}10{\EdbZSp}$\sim${\EdbZSp}2017.{\EdbZSp}6}])} %
\BULLET{}\項目II{{\bfseries Department of Space and Astronautical Science, The Graduate University for Advanced Studies (SOUKENDAI)}}{ (PhD Thesis Committee Member, [\期間{2020.{\EdbZSp}1}])} %
\BULLET{}\項目II{{\bfseries Committee on Advancement of Maintenance Technology and Asset Management for Underground Transmission Facilities, Electric Technology Research Association}}{ (Committee Member [\期間{2020.{\EdbZSp}7{\EdbZSp}$\sim${\EdbZSp}2023.{\EdbZSp}3}])} %
\BULLET{}\項目II{{\bfseries The maintenance investigative committee for SCFF (self-contained, fluid-filled) Cable, TEPCO Power Grid, Inc.,}}{ (Committee member (Reference: https://www.occto.or.jp/iinkai/chinai\_rule/2020/files/renkeisen-chinai\_kentoukai\_12\_04.pdf) [\期間{2020.{\EdbZSp}7{\EdbZSp}$\sim${\EdbZSp}8}])} %
\BULLET{}\項目II{{\bfseries Faculty of Science and Engineering, University of Manchester, UK}}{ (Referee [\期間{2023.{\EdbZSp}3}])} %
\BULLET{}\項目II{グローバル大学院工学教育プログラム運営委員}{ (\期間{2009.{\EdbZSp}4{\EdbZSp}$\sim${\EdbZSp}2011.{\EdbZSp}3})} %
\BULLET{}\項目II{グローバル大学院工学教育プログラム部門員}{ (\期間{2009.{\EdbZSp}4{\EdbZSp}$\sim${\EdbZSp}2011.{\EdbZSp}3})} %
\BULLET{}\項目II{Coordinator (Proposition and Coordination) for Academic Agreement with University of Colorado at Boulder(USA)}{ (\期間{2010.{\EdbZSp}2{\EdbZSp}$\sim${\EdbZSp}})} %
\BULLET{}\項目II{国際連携教育開発センター運営委員会委員}{ (\期間{2010.{\EdbZSp}4{\EdbZSp}$\sim${\EdbZSp}2011.{\EdbZSp}3})} %
\BULLET{}\項目II{国際連携教育開発センター部門員}{ (\期間{2010.{\EdbZSp}4{\EdbZSp}$\sim${\EdbZSp}2011.{\EdbZSp}3})} %
\BULLET{}\項目II{国際連携教育開発センター運営委員会委員}{ (\期間{2011.{\EdbZSp}4{\EdbZSp}$\sim${\EdbZSp}2013.{\EdbZSp}3})} %
\BULLET{}\項目II{国際連携教育開発センター部門員}{ (\期間{2011.{\EdbZSp}4{\EdbZSp}$\sim${\EdbZSp}2013.{\EdbZSp}3})} %
\BULLET{}\項目II{グローバル大学院工学教育プログラム運営委員}{ (\期間{2011.{\EdbZSp}4{\EdbZSp}$\sim${\EdbZSp}2013.{\EdbZSp}3})} %
\BULLET{}\項目II{グローバル大学院工学教育プログラム部門員}{ (\期間{2011.{\EdbZSp}4{\EdbZSp}$\sim${\EdbZSp}2013.{\EdbZSp}3})} %
\BULLET{}\項目II{Coordinator (Proposition and Coordination) for Academic Agreement with Beihang University (China)}{ (\期間{2011.{\EdbZSp}8{\EdbZSp}$\sim${\EdbZSp}2021.{\EdbZSp}8})} %
\BULLET{}\項目II{国際連携教育開発センター部門員}{ (\期間{2013.{\EdbZSp}4{\EdbZSp}$\sim${\EdbZSp}2015.{\EdbZSp}3})} %
\BULLET{}\項目II{国際連携教育開発センター運営委員会委員}{ (\期間{2013.{\EdbZSp}4{\EdbZSp}$\sim${\EdbZSp}2015.{\EdbZSp}3})} %
\BULLET{}\項目II{グローバル大学院工学教育プログラム運営委員}{ (\期間{2013.{\EdbZSp}4{\EdbZSp}$\sim${\EdbZSp}2015.{\EdbZSp}3})} %
\BULLET{}\項目II{グローバル大学院工学教育プログラム部門員}{ (\期間{2013.{\EdbZSp}4{\EdbZSp}$\sim${\EdbZSp}2015.{\EdbZSp}3})} %
\BULLET{}\項目II{グローバル大学院工学教育プログラム運営委員}{ (\期間{2015.{\EdbZSp}4{\EdbZSp}$\sim${\EdbZSp}2018.{\EdbZSp}3})} %
\BULLET{}\項目II{国際連携教育開発センター運営委員会委員}{ (\期間{2015.{\EdbZSp}4{\EdbZSp}$\sim${\EdbZSp}2018.{\EdbZSp}3})} %
\BULLET{}\項目II{国際連携教育開発センター部門員}{ (\期間{2015.{\EdbZSp}4{\EdbZSp}$\sim${\EdbZSp}2018.{\EdbZSp}3})} %
\BULLET{}\項目II{グローバル大学院工学教育プログラム部門員}{ (\期間{2015.{\EdbZSp}4{\EdbZSp}$\sim${\EdbZSp}2018.{\EdbZSp}3})} %
\BULLET{}\項目II{国際連携教育開発センター 副センター長}{ (\期間{2016.{\EdbZSp}4{\EdbZSp}$\sim${\EdbZSp}2017.{\EdbZSp}3})} %
\BULLET{}\項目II{Vice Chair of Entrance Examination Committee in Faculty of Science and Technology}{ (\期間{2019.{\EdbZSp}5{\EdbZSp}$\sim${\EdbZSp}2020.{\EdbZSp}4})} %
\BULLET{}\項目II{工学部入学試験委員会副委員長}{ (\期間{2019.{\EdbZSp}5{\EdbZSp}$\sim${\EdbZSp}2020.{\EdbZSp}4})} %
\BULLET{}\項目II{教育部代議員会}{ (\期間{2020.{\EdbZSp}5})} %
\BULLET{}\項目II{Chair of Entrance Examination Committee in Faculty of Science and Technology}{ (\期間{2020.{\EdbZSp}5{\EdbZSp}$\sim${\EdbZSp}2021.{\EdbZSp}4})} %
\BULLET{}\項目II{Committee Member of Entrance Examinations}{ (\期間{2020.{\EdbZSp}5{\EdbZSp}$\sim${\EdbZSp}2021.{\EdbZSp}4})} %
\BULLET{}\項目II{工学部入学試験委員会委員長}{ (\期間{2020.{\EdbZSp}5{\EdbZSp}$\sim${\EdbZSp}2021.{\EdbZSp}4})} %
\BULLET{}\項目II{理工学部・日亜特別待遇奨学生審査委員会}{ (\期間{2020.{\EdbZSp}5{\EdbZSp}$\sim${\EdbZSp}2021.{\EdbZSp}4})} %
\BULLET{}\項目II{理工学部広報委員会委員(理工学部入試委員長就任による)}{ (\期間{2020.{\EdbZSp}5{\EdbZSp}$\sim${\EdbZSp}2022.{\EdbZSp}3})} %
}%
\DEF{受賞等}{\BULLET{}\年月{1995.{\EdbZSp}1.} IEEJ Presentation Award(Masatake Kawada) (IEEJ) (The Institute of Electrical Engineers of Japan) %
\BULLET{}\年月{2003.{\EdbZSp}9.} Presentation Award, 2005 Shikoku-Section Joint Convention Record of The Institute of Electrical and Related Engineers(Yusaku Minato, M2) (IEEJ) %
\BULLET{}\年月{2005.{\EdbZSp}1.} IEEJ Presentation Award(Masatake Kawada) (IEEJ) (The Institute of Electrical Engineers of Japan) %
\BULLET{}\年月{2005.{\EdbZSp}9.} Presentation Award, 2006 Shikoku-Section Joint Convention Record of The Institute of Electrical and Related Engineers(Khammanivong Somsay, M2) (IEEJ) %
\BULLET{}\年月{2006.{\EdbZSp}9.} Presentation Award, 2006 Shikoku-Section Joint Convention Record of The Institute of Electrical and Related Engineers(Yoshiteru Fukuda, M2) (IEEJ) %
\BULLET{}\年月{2006.{\EdbZSp}9.} Presentation Award, 2006 Shikoku-Section Joint Convention Record of The Institute of Electrical and Related Engineers(Ko Chin,M2) (IEEJ) %
\BULLET{}\年月{2006.{\EdbZSp}9.} Presentation Award, 2006 Shikoku-Section Joint Convention Record of The Institute of Electrical and Related Engineers(Suguru Harada, M2) (IEEJ) %
\BULLET{}\年月{2007.{\EdbZSp}3.} IEEJ Annual Conference Presentation Award(Yoshitaka Higuchi, M2) (IEEJ) %
\BULLET{}\年月{2007.{\EdbZSp}9.} Presentation Award, 2007 Shikoku-Section Joint Convention Record of The Institute of Electrical and Related Engineers(Ye Tian, M2) (IEEE) %
\BULLET{}\年月{2007.{\EdbZSp}10.} Presentation Award, IEEJ Annual Conference of Foundamentals and Materials Society(Takashi Kuraishi, M2) (IEEJ) %
\BULLET{}\年月{2007.{\EdbZSp}11.} Honored as a Young Excellent Professor by the President of the University of Tokushima (Masatake Kawada) (Tokushima University) %
\BULLET{}\年月{2007.{\EdbZSp}11.} 2007 Japan-Korea Joint Symposium on Electrical Discharge and High Voltage Engineering(Khammanivong Somsay, D2) (IEEJ) %
\BULLET{}\年月{2008.{\EdbZSp}3.} IEEJ Annual Conference Presentation Award (Ye Tian, M2) (IEEJ) %
\BULLET{}\年月{2008.{\EdbZSp}9.} 2008 International Symposium on Electrical Insulating Materials(Ye Tian, D1) (IEEJ) %
\BULLET{}\年月{2009.{\EdbZSp}3.} 16th Gennai Research Award (Masatake Kawada) (財団法人 エレキテル尾崎財団) %
\BULLET{}\年月{2009.{\EdbZSp}3.} IEEJ Annual Conference Presentation Award(Tetsuya Murayama, M2) (IEEJ) %
\BULLET{}\年月{2009.{\EdbZSp}7.} Outstanding Engineering Award, The 2009 International Future Energy Challenge, (with Distinguished Prof.\ Frank S.\ Barnes, University of Colorado at Boulder) (IEEE Power Electronics Society) %
\BULLET{}\年月{2009.{\EdbZSp}7.} Outstanding Teamwork Award, The 2009 International Future Energy Challenge, (with Distinguished Prof.\ Frank S.\ Barnes, University of Colorado at Boulder) (IEEE Power Electronics Society) %
\BULLET{}\年月{2009.{\EdbZSp}9.} Presentation Award, 2009 Shikoku-Section Joint Convention Record of The Institute of Electrical and Related Engineers (Ye Tian, D2) (IEEJ) %
\BULLET{}\年月{2009.{\EdbZSp}9.} IEEJ Presentation Award, 2009 Shikoku-Section Joint Convention Record of The Institute of Electrical and Related Engineers(Kentaro Watanabe, M2) (IEEJ) %
\BULLET{}\年月{2009.{\EdbZSp}9.} Presentation Award, 2009 Shikoku-Section Joint Convention Record of The Institute of Electrical and Related Engineers(Hirokazu Ishimaru, NIT) (IEEJ) %
\BULLET{}\年月{2010.{\EdbZSp}5.} Best Oral Presentation Award, 2th International On-Board Symposium (Ye Tian, D3) (University of Tokushima and Korea Maritime University) %
\BULLET{}\年月{2013.{\EdbZSp}3.} 工学部国際化貢献賞 (Faculty of Engineering) %
\BULLET{}\年月{2018.{\EdbZSp}3.} 工学部国際化貢献賞 (Faculty of Engineering) %
\BULLET{}\年月{2021.{\EdbZSp}4.} Award for Education in Liberal Arts Program in 2020 (徳島大学大学院社会産業理工学研究部) %
}%
\end{PROFILE}
\endinput
