\begin{PROFILE}
\HavePortraittrue%
\DEF{所属}{\所属P{293307}{Graduate School of Biomedical Sciences 薬学域 Pharmaceutical Science Pharmaceutical Life Sciences Department of Medical Pharmacology }\所属S{26134}{Faculty of Medicine School of Medicine Course of Biological Medicine }\所属S{204544}{Faculty of Pharmaceutical Sciences Pharmaceutical Sciences Clinical Pharmacy Medical Pharmacology }\所属S{398254}{Research Clusters Research Clusters (Registered) 2104018 徳島の特産品(藍，スダチ)の，薬用および産業資源としての活用を志向した基礎研究 }\所属S{262728}{Graduate School of Pharmaceutical Sciences Pharmacy }}%
\DEF{EID}{60114}%
\DEF{肩書}{Professor}%
\DEF{名前}{Tsuchiya, Koichiro}%
\DEF{名前:日}{土屋 浩一郎}%
\DEF{名前:読}{つちや こういちろう}%
\DEF{名前:英}{Tsuchiya, Koichiro}%
\DEF{職名}{Professor}%
\DEF{性別}{{\NONE}}%
\DEF{生年}{1965}%
\DEF{電話}{+81-88-633-7250}%
\DEF{電子メール}{\EdbEMAIL{tsuchiya@tokushima-u.ac.jp}{tsuchiya@tokushima-u.ac.jp}}%
\DEF{学歴}{%
	\履歴{1989.{\EdbZSp}3.}{Department of Pharmacology, The University of Tokushima}%
 %
	\履歴{1991.{\EdbZSp}2.}{徳島大学 大学院薬学研究科博士後期課程 退学}%
 %
	\履歴{1991.{\EdbZSp}3.}{raduate school of Pharmacology, The University of Tokushima (Master course)}%
 %
}%
\DEF{学位}{Doctor of Philosophy (Medicine) (Tokushima University) (\DateYM{1997.{\EdbZSp}2})}%
\DEF{職歴}{%
	\履歴{1992.{\EdbZSp}4.}{Pharmacist, Tokushima University Hospital}%
 %
	\履歴{1997.{\EdbZSp}10.}{Assistant professor, Tokushima University School of Medicine}%
 %
	\履歴{1998.{\EdbZSp}4.}{Visiting fellow at National Institute of the Environmental Health Sciences (NIEHS)/NIH, RTP, NC 27709 USA.}%
 %
}%
\DEF{担当授業科目}{%
\BULLET{}{\bfseries Special Lecture for Oncology Pharmacist} (Graduate School) %
\BULLET{}{\bfseries Anticancer drugs} (Graduate School) %
\BULLET{}{\bfseries Introduction of advanced medical care} (Bachelor Course) %
\BULLET{}{\bfseries Advanced Clinical Pharmacy} (Bachelor Course) %
\BULLET{}{\bfseries Introduction of advanced clinical research} (Bachelor Course) %
\BULLET{}{\bfseries Ethics and Human Studies in Healthcare} (Bachelor Course) %
\BULLET{}{\bfseries Simulated experience of medical practice} (Bachelor Course) %
\BULLET{}{\bfseries Advanced Interprofessional Education} (Bachelor Course) %
\BULLET{}{\bfseries Pharmacy Practice - Hospital Pharmacy} (Bachelor Course) %
\BULLET{}{\bfseries Pharmacy Practice - Community Pharmacy} (Bachelor Course) %
\BULLET{}{\bfseries Applied Seminar on Medical Pharmacy} (Graduate School) %
\BULLET{}{\bfseries Special Lecture for Drug Safety Studies} (Graduate School) %
\BULLET{}{\bfseries Special Lecture for Drug Development} (Graduate School) %
\BULLET{}{\bfseries Introduction of community healthcare} (Bachelor Course) %
\BULLET{}{\bfseries Pharmacy Practice - Pretraining} (Bachelor Course) %
\BULLET{}{\bfseries Graduate School, Course Open Seminar} (Graduate School) %
\BULLET{}{\bfseries Seminar} (Bachelor Course) %
\BULLET{}{\bfseries Seminar 1} (Bachelor Course) %
\BULLET{}{\bfseries Seminar 2} (Bachelor Course) %
\BULLET{}{\bfseries Seminar 3} (Bachelor Course) %
\BULLET{}{\bfseries Practice of Biochemistry} (Bachelor Course) %
\BULLET{}{\bfseries Seminar of Drug Development} (Graduate School) %
\BULLET{}{\bfseries Pharmacology} (Graduate School) %
\BULLET{}{\bfseries Research Training in Clinical Pharmaceutical Sciences} (Graduate School) %
\BULLET{}{\bfseries Doctoral Thesis Research in Clinical Pharmaceutical Sciences} (Graduate School) %
\BULLET{}{\bfseries Pharmacology and Pharmacotherapeutics 2} (Bachelor Course) %
\BULLET{}{\bfseries Pharmacology and Pharmacotherapeutics 4} (Bachelor Course) %
\BULLET{}{\bfseries Pharmacology and Pharmacotherapeutics 5} (Bachelor Course) %
\BULLET{}{\bfseries Pharmacology and Pharmacotherapeutics 5} (Bachelor Course) %
\BULLET{}{\bfseries Introduction to Drug Therapy Management} (Bachelor Course) %
\BULLET{}{\bfseries 薬理学} (Bachelor Course) %
\BULLET{}{\bfseries Research Training in Pharmaceutical Sciences I} (Graduate School) %
\BULLET{}{\bfseries Master's Thesis Research in Pharmaceutical Sciences} (Graduate School) %
\BULLET{}{\bfseries Special Lecture for Multidisciplinary Pharmaceutical Therapy} (Graduate School) %
}%
\DEF{専門分野}{%
\BULLET{}{\bfseries Clinical Pharmacology} %
}%
\DEF{研究概要}{%
\BULLET{}Detection of ROS and RNS in in vivo (\KEYWORD{reactive oxygen species}, \KEYWORD{reactive nitrogen species}, \KEYWORD{electron paramagnetic resonance}) %
}%
\DEF{著書・論文:数}{%
\著作件数{Book}{16}\著作件数{Academic Paper (Judged Full Paper)}{154}\著作件数{Academic Paper (Unrefereed Paper)}{8}\著作件数{Review, Commentary}{9}\著作件数{Proceeding of International Conference}{141}\著作件数{Proceeding of Domestic Conference}{418}\著作件数{Et cetera, Workshop}{20}\著作件数{Report}{1}\著作件数{Patent}{9}}%
\DEF{著書・論文}{%
}%
\DEF{所属学会(役職):数}{8}%
\DEF{社会・学内活動等:数}{1}%
\DEF{受賞等:数}{0}%
\DEF{所属学会(役職)}{%
\BULLET{}\項目II{The Japanese Society of Clinical Pharmacology and Therapeutics}{} %
\BULLET{}\項目II{Japanese Society of Toxicology}{} %
\BULLET{}\項目II{Japanese Society of Hypertension}{} %
\BULLET{}\項目II{The Japanese Pharmacological Society}{} %
\BULLET{}\項目II{The Japanese Pharmacological Society}{ (評議員)} %
\BULLET{}\項目II{日本心脈管作動物質学会}{ (評議員)} %
\BULLET{}\項目II{The Japanese Pharmacological Society}{ (学術評議員)} %
\BULLET{}\項目II{The Japanese Pharmacological Society}{ (学術評議員)} %
}%
\DEF{社会・学内活動等}{%
\BULLET{}\項目II{{\bfseries 徳島県保健福祉部}}{ (徳島県後発医薬品適正使用協議会委員)} %
}%
\DEF{受賞等}{{\NONE}}%
\end{PROFILE}
\endinput
